S4 Fig. Level of the Ad-lacZ inflating epitope D8V in the peripheral blood after MCMV reinfection or infection with a lower dose of MCMV

0 5 19 0

10

20

30

40

Days after MCMV re-infection

% CD8 T Cells

MCMV+Ad+MCMV �

�

0 7 15 21 0 5 10 15 20 25 30 35 40

Days after low dose MCMV infection

% CD8 Tet+ Cells

p=0.03

Ad-lacz +MCMV D8V

ns p=0.01